2.5 3 3.5 4 4.5_{)2c (GeV/μμm} 0 20 40 60 80 100 120 140 160 180

)^2c Counts per 25 (MeV/

= 5.02 TeV NNs Pb − ALICE, Pb

-μ ^+μ→ψJ/

-1bμ 6± = 233 int UPC, L 2c 2 GeV (0.0040,0.0062)

∈_T^2p

| < 0.8 y| -20 +21 = 388 ψJ/N

ALI-PUB-496175

ALI-PUB-496175